) (cm) ϕ(r_0 d

-0.06 -0.04 -0.02 0 0.02 0.04 0.06

Normalized counts (a.u.)

1

10

210

310 PYTHIA e → c) → b ( e →c Conversions (V0) Dalitz decays

Data Conversions (V0)

= 2.76 TeV s ALICE pp,

(a)

m) μ (_0 d

-600 -400 -200 0 200 400 600

Data/MC

0 0.5 1 1.5 2 2.5 3 Conversions (V0) (b)